INFN - CNRSNTS 96-37Date : June 20, 96 B. Mours

Minutes of the Electronics & Software MeetingAnnecy, June 13, 1996Please refer to the enclosed transparencies for the details. Here we only gives somecomments about the discussions.¥ R. Bilhaut: Presented VIRGOnet, the network for Virgo.¥ P. Roudier: Described the LAL control activities.- The network call for tender is in preparation. The advertisement should be ready fornext week. The goal is to have the first network part ready when the control building willbe delivered (next march).- The pumping part of the tower software will be tested next week. The system should beready and delivered in September for the Annecy tower. For the final system in Cascina,he still needs information from the vacuum group about restart sequences and cabling.The test system should be made available if we want the software ready in March 97. Infact this test system may only available at the end of this year which will delay thedelivery of the software.- Hardware development: Orsay is investigating the construction of a low cost DACbased on M module with an external trigger for the mode cleaner control.- Gaz analyser: The use of them has to be understand. The LAL group has to check withVacuum group what is needed and possible to do.¥ P. Heusse: Presented the status of general software packages, And described theforeseen first step for the Supervisor.¥ F. Cavalier: Presented new results of the hardware evaluation for the Global Control. APower PC CPU board build by CES will be tested in the coming months.¥ D. Dufournaud: Described the status of the workstation selection. The goal is to have afirst set of workstation when the control building will be ready, which means to select theworkstations this fall.¥ B. Mours: Described the proposition of the new timing system. The corresponding notewill be distributed next week in order to freeze the specifications.¥ R. Hermel: Presented the status of the photodiode electronic.¥ F. Barone: Presented the status of the Building Control , Environment monitoring andraw data archiving system. It was pointed out that the requirements for the cosmic raydetector are not yet defined.¥˚P. Mastroserio: Gave a presentation about AFS. The Napoli group will investigate thepossibility of using AFS to distribute the software starting from the central site inCascina.¥˚S. Grasso: Described an evaluation of the very low pressure acoustic noise in Virgoantenna. Following this work he will propose the detailed location of the monitoringmicrophones.¥˚D. Borrelli: Presented a computation of the Electromagnetic noise effect.¥ A. Grado: Presented an evaluation of the coupling between the acoustic noise andVirgo. Following this work he will propose the detailed location of the monitoringmicrophones.Simulation:¥ F. Marion: Presented the status of SIESTA, the list of available optical simulations andvalidations tests of the optical simulation.¥ B. Bhawal: Presented a work for a fast simulation of dynamically compound cavitiesand interferometers.