22.50

33.00

57.00

77.00

97.00

117.00

137.00

185.00

211.00

232.0012.5020.00

7.25

7.25

5.25

5.252.252.25fl2.30fl6.40fl6.20fl9.50

167.0027.00

6.00

6.0012.0012.002 trous8 trousfraisagepour visTF de 2,5fraisagepour visTF de 2,5

15.50

39.50

59.50

79.50

99.50

119.50

149.50

193.50

214.50

7.25

7.25

5.25

5.252.252.25fl2.30fl6.40fl6.20fl9.5018.5011.00

5.00

2.5025.50

133.00

89.0035.505.50 fl2.506.0010.00

2.50

133.00

89.00tole laiton 3/10em

167.5012.0012.00

6.00

6.00 fl2.50 fl2.50 fl2.508 trous2 trous

3 trous D 2.5

227.50

I N OUTDELAY LOI N OUT MC ADCRearm TTLRearmR e d - o f f Green-onDETECTIONDIODESPMonitorBIAS owerVOUTOUT9 0 LO0RFNNNN= 1 a 35