20.0

35.0

55.0

75.0

95.0

115.0

135.0

165.0

185.0

205.0

225.0

262.0fl11.5fraisagepour visO 2,5fraisagepour visO 2,510 TROUS10.4

26.0

45.0

65.0

85.0

105.0

125.0

175.0

195.0

215.0

235.0fl2.510 TROUS FILETEPOUR VIS DE USINAGE F.A.DISTRIBUTIONL.O.

OUTIN VI N LO12345678N=1 a 15DISTRIBUTIONLO N GRAVURELO

52.0

72.0

92.0

112.0

142.0

162.0

182.0

202.0

216.06.012.0

3.0

22.0

12.0

42.0

62.0

82.0

102.0

121.0

152.0

172.0

192.0

212.0

12.58.9

32.0fl2.610 TROUS10 PRISES BNCC.I. POUR FACE AVANT DISTRIBUTION LO