CNRSINFNCentre National de la Recherche ScientifiqueIstituto Nazionale di Fisica NucleareLAPPVIR-TRE-LAP-5200-100Date: 20/9/96

DOC:VIR-TRE-LAP-5200-100Date20/9/96Page:2/51- Introductionof to standardfor of Virgo. About Finalof to they run any to if oneof thetype of additionalto of differentfor imaging,They for softwaresimulationto of They computingto Xof Virgo to thethat onof next to 2- First selectionAtvirgo Annecy ,I have theHP,IBM,SGI, of summarizedbellow: ALPHA 21164 (v5 version)SGIUnix SYSTEM

DOC:VIR-TRE-LAP-5200-100Date20/9/96Page:3/5If IBMAXIL - - to pooroutof Finally, SGI notProcessortypeclock(MHz)spec95-intspec95-fpXmarksReducedprice kFALPHA (500)211642667.41028.861164003339.213.632.431405004001114.136.217460050015.019.5NAPA-RISC800016010.416.334.515000018011.817.5>170000MIPS100002008.912.5NA165700Ultra SparcUltra 1/21706.269.061257002007.6711.1145500have hardwarefor every of memoryto Mo bottleneckcapacity ,only Go for small" colorof Afor a s UNIX ROM ANSI C++except for andSGI of for finaldiscussion.3- Discussion

DOC:VIR-TRE-LAP-5200-100Date20/9/96Page:4/5if for typically SGI thehave of for For weDECCAMPUS. All theof processorof of levelfor ultrasparc.In ,the 500/266andhave for Italy. somedifficulty between HP-FRANCE and HP ITALY.If of ,modelseemsfor specialoffer have theto UNIX They NT bitsyearsfor UNIX only for for management.4- RecommendationIthat

DOC:VIR-TRE-LAP-5200-100Date20/9/96Page:5/5Annexe 1:VendorCPUtypeModelbitsrmance %knowledgecommentsdelaySPEint92fp92int95fp95DECalpha21164500/333643894808.612127,920%Lal,Lapp,NapoliDigitalunix3-4weeksDECalpha21164600/266643294297.2910.517520%id3-4weeksDECalpha21164600/333644125469.1913.6159,820%id3-4weeksHP72003214022430%lal,lapp,HP-UX(32bits)3-4weeksHP8000644006009.517.5150,0030%annoucemHP-UX10.207200upgradeIBMpower23CT321302663.4210.2148,0040%PiseSGImips/2010000643006008.912.5165,7035%3 weeksSGImips/18644.14.435%id3 weeksSUNultrasparc1/170642503516.269.06115,5030%nonesolaris2.5AXILultrasparc1/1436421530379,7035%id(clone)4 weeksDECalpha2116410004/26664197.526397,2020%3-4weeks